130
4
0.444452047348
-26.4214000702
12
6
4
0.1109547019
0.433342397213
0.84002161026
-115.928443909
15.9978103638
-3.99945783615
0.0677443817258
0.80491900444
0.686735272408
0.765096783638
0.595073997974
0.327199816704
0
0.75
16
6
2
5
3
1
0.0
0.199982494116
m
1
2.0
0.0
0.0
0.0
0.0
17.5603485107
17.8704032898
119.983650208
0.00999999977648
0.0
0.0
-9.9986371994
0.0118040582165
7
0.364309459925
4
