130
3
0.377794414759
0.0
3
1
2
0.14999319613
1.0
1.0
-73.2304000854
0.0
38.0227165222
0.115539841354
0.922232866287
0.75
0.75
0.75
0.0
0
0.75
16
5
2
3
1
3
0.10000000149
0.15263158083
l
1
1.899761796
167.977142334
0.0
0.0
0.0
12.602850914
90.0
40.9090919495
0.0
0.0
33.9953689575
0.0
0.0500000007451
30
0.10000000149
6
